1.0 LITERATURE

• R. Hill: A first course in coding theory, Claredon Press, 1985 • V. Pless: Introduction to the theory of error-correcting codes John Willey, 1998

• J. Gruska: Foundations of computing, Thomson International Computer Press, 1997 • A. Salomaa: Public-key cryptography, Springer, 1990 • D. R. Stinson: Cryptography: theory and practice, 1995 • B. Schneier: Applied cryptography, John Willey and Sons, 1996 • J. Gruska: Quantum computing, McGraw-Hill, 1999 (For additions and updatings:

http://www.mcgraw-hill.co.uk/gruska)

• S. Singh, The code book, Anchor Books, 1999 • D. Kahn: The codebreakers. Tho story of secret writing.

Macmillan, 1996 (An entertaining and informative history of cryptography.)